Pubkey Encrypt (8.x-1.0-beta1) - en to unknown language translation catalogue (8 entries)

en: Yes
target: Ja

en: No
target: Nei

en: Message
target: Melding

en: Settings
target: Innstillinger

en: Role name
target: Rollenavn

en: Role
target: Rolle

en: None.
target: Ingen.

en: An error occurred while processing %error_operation with arguments: @arguments
target: Det oppsto en feil under behandling av %error_operation med argumenter: @arguments
