Request Parameter Condition (8.x-1.0-alpha1) - en to unknown language translation catalogue (5 entries)

en: Value
target: Valor

en: System
target: Sistema

en: Operation
target: Operação

en: Case Sensitive
target: Diferencia maiúsculas de minúsculas

en: Parameter
target: Parâmetro
