Schema Diff (1.0.0-alpha2) - en to unknown language translation catalogue (3 entries)

en: Installed
target: 已安装

en: Entity/field definitions
target: 实体/字段 定义

en: The following changes were detected in the entity type and field definitions. @updates
target: 在实体类型和字段定义中检测到以下更改。@updates
