Select2 Boxes (8.x-1.0-alpha1) - en to unknown language translation catalogue (4 entries)

en: Version
target: Versão

en: - None -
target: - Nenhum -

en: Anonymous
target: Anónimo

en: Loading...
target: Carregando...
