Shunt (8.x-2.0-beta3) - en to unknown language translation catalogue (8 entries)

en: Status
target: Estado

en: Delete
target: Eliminar

en: Cancel
target: Cancelar

en: Description
target: Descrição

en: Reset
target: Reiniciar

en: Label
target: Etiqueta

en: label
target: etiqueta

en: Hello world!
target: Olá mundo!
