Shunt (8.x-2.0-beta4) - en to unknown language translation catalogue (7 entries)

en: Delete
target: Slett

en: Cancel
target: Avbryt

en: Description
target: Beskrivelse

en: Reset
target: Nullstill

en: Label
target: Etikett

en: Protected
target: Beskyttet

en: label
target: etikett
