Simple Analytics (8.x-2.1-rc2) - en to unknown language translation catalogue (5 entries)

en: Default
target: Predefinido

en: History
target: Histórico

en: Custom
target: Personalizado

en: Configuration
target: Configuração

en: Today
target: Hoje
