Textfield Counter (8.x-1.10) - en to unknown language translation catalogue (8 entries)

en: Disabled
target: 停用

en: Yes
target: 是

en: No
target: 否

en: Before
target: 之前

en: After
target: 之後

en: 1 character | @count characters
target[0]: 1 字元
target[1]: @count 字元

en: Maximum number of characters
target: 最大字元數

en: @name cannot be longer than %max characters but is currently %length characters long.
target: @name 不能超過 %max 個字元，目前長度為 %length 個字元。
