Toolbar Anti-flicker (8.x-2.0) - en to unknown language translation catalogue (5 entries)

en: Home
target: 首页

en: Toolbar
target: 工具栏

en: Horizontal orientation
target: 横向

en: Vertical orientation
target: 纵向

en: The toolbar cannot be set to a horizontal orientation when it is locked.
target: 工具栏锁定时无法设置为横向显示。
