Taxonomy Views Integrator (8.x-1.0-alpha1) - en to unknown language translation catalogue (3 entries)

en: The configuration options have been saved.
target: Innstillingene er lagret.

en: Save
target: Lagre

en: Global settings
target: Globale innstillinger
