PayUmoney for Ubercart (8.x-3.0) - en to unknown language translation catalogue (4 entries)

en: Mode
target: 模式

en: Ubercart - payment
target: Ubercart - 付款

en: Order complete
target: 訂單完成

en: Submit order
target: 送出訂單
