UIkit Grid Layouts (1.0.1) - en to unknown language translation catalogue (12 entries)

en: Center
target: Central

en: Default
target: Padrão

en: Small
target: Pequeno

en: Large
target: Grande

en: Medium
target: Médio

en: Left
target: Esquerda

en: Right
target: Direita

en: No limit
target: Sem limite

en: Primary
target: Primário

en: Secondary
target: Secundário

en: Allowed extensions: gif png jpg jpeg
target: Extensões permitidas: gif png jpg jpeg

en: Muted
target: Silenciado
