jQuery-viewport-checker (8.x-1.4) - en to unknown language translation catalogue (7 entries)

en: Pages
target: 页面

en: Development
target: 开发

en: Not installed
target: 未安装

en: Installed
target: 已安装

en: Show for the listed pages
target: 为下列页面显示

en: Hide for the listed pages
target: 为下列页面隐藏

en: Specify pages by using their paths. Enter one path per line. The '*' character is a wildcard. An example path is %user-wildcard for every user page. %front is the front page.
target: 使用路径指定页面。每行输入一个路径。“*”字符是通配符。示例路径为 %user-wildcard（针对每个用户页面）。%front 是首页。
