Website Speed Monitoring (1.0.0-alpha1) - en to unknown language translation catalogue (4 entries)

en: Summary
target: Sammendrag

en: About
target: Om

en: Configuring the module
target: Konfigure modulen

en: Uses
target: Bruker
