Weight (8.x-3.1-alpha2) - en to unknown language translation catalogue (5 entries)

en: Weight
target: Peso

en: Default
target: Por defeito

en: Range
target: Intervalo

en: Unsigned
target: Não assinado

en: Field types
target: Tipos de campo
