XY Grid Layouts (8.x-2.0-beta1) - en to unknown language translation catalogue (6 entries)

en: Type
target: Tipo

en: Default
target: Por defeito

en: Full
target: Completo

en: Grid
target: Grelha

en: About
target: Sobre

en: Fluid
target: Fluido
