Automatic Updates (8.x-2.6) - en to unknown language translation catalogue (2 entries)

en: Operating in maintenance mode.
target: Ke hana nei ke kaha pūnaewele i ka pēʻano mālama ʻana.

en: Perform updates with site in maintenance mode (strongly recommended)
target: E hana i nā hoʻopuka hou loa ma ka pēʻano mālama ʻana (paipai ʻia nui loa).
