Extra Config Field (8.x-1.1) - en to unknown language translation catalogue (5 entries)

en: Status
target: Støða

en: Disabled
target: Óvirkjað

en: Enabled
target: Virkjað

en: Name
target: Navn

en: Machine name
target: Maskinnavn
