Facebook social plugins (1.2.1) - en to unknown language translation catalogue (8 entries)

en: Width
target: Largura

en: Height
target: Altura

en: standard
target: padrão

en: Tabs
target: Abas

en: small
target: pequeno

en: large
target: grande

en: About
target: Sobre

en: button
target: botão
