Google Authenticator login (8.x-1.0-alpha4) - en to unknown language translation catalogue (6 entries)

en: Save
target: Salvar

en: System
target: Sistema

en: Verify
target: Verificar

en: TFA application
target: Aplicação TFA

en: Set up application
target: Configurar aplicação

en: Reset application
target: Resetar aplicação
