Google API PHP Client (8.x-3.0-alpha2) - en to unknown language translation catalogue (15 entries)

en: Delete
target: Eliminar

en: Yes
target: Sim

en: No
target: Não

en: Edit
target: Editar

en: Name
target: Nome

en: Label
target: Etiqueta

en: View
target: Mostrar

en: User
target: Utilizador

en: here
target: aqui

en: Not installed
target: Não instalado

en: Installed
target: Instalado

en: Services
target: Serviços

en: About
target: Sobre

en: Uses
target: Usos

en: Machine Name
target: Nome de máquina
