Health Check Url (8.x-3.3) - en to unknown language translation catalogue (5 entries)

en: Text
target: Texto

en: About
target: Sobre

en: Uses
target: Usos

en: Performance and scalability
target: Performance e escalabilidade

en: The path '%path' has to start with a slash.
target: O caminho '%path' deve iniciar com uma barra.
