Hide Revision Field (8.x-2.2) - en to unknown language translation catalogue (6 entries)

en: Forms
target: Formulários

en: Default
target: Predefinido

en: Rows
target: Linhas

en: Show
target: Mostrar

en: Default value
target: Valor predefinido

en: Placeholder
target: Espaço reservado
