Interval Field (8.x-1.0-alpha1) - en to unknown language translation catalogue (4 entries)

en: Date
target: Ceann-là

en: Save
target: Sàbhail

en: Plain
target: Lom

en: Save settings
target: Sàbhail na roghainnean
