jquery carousel (8.x-1.0-beta1) - en to unknown language translation catalogue (6 entries)

en: None
target: Nenhum

en: True
target: Verdadeiro

en: False
target: Falso

en: Default
target: Predefinido

en: Interval
target: Intervalo

en: Pagination
target: Paginação
