JScroll Pane (8.x-1.0-alpha1) - en to unknown language translation catalogue (6 entries)

en: User interface
target: Brukergrensesnitt

en: Yes
target: Ja

en: No
target: Nei

en: True
target: Sant

en: False
target: Ikke sant

en: About
target: Om
