Login Flow (1.0.0-alpha3) - en to unknown language translation catalogue (19 entries)

en: Body
target: 正文

en: Operations
target: 操作

en: Subject
target: 主题

en: Enabled
target: 启用

en: Edit
target: 编辑

en: Password
target: 密码

en: Weight
target: 权重

en: Save
target: 保存

en: Summary
target: 摘要

en: Log in
target: 登录

en: The username %name has not been activated or is blocked.
target: 用户名 %name 尚未激活或已被屏蔽。

en: Login attempt failed for %user.
target: %user 登录失败。

en: Password reset instructions mailed to %name at %email.
target: %name 的密码重置说明已发送至 %email 。

en: Password field is required.
target: 必须填入密码。

en: Login failed
target: 登录失败

en: The one-time login link you clicked is invalid.
target: 你点击的一次性登录链接无效。

en: Login attempt failed from %ip.
target: 从%ip 的登录尝试失败。

en: Too many failed login attempts from your IP address. This IP address is temporarily blocked. Try again later or <a href=":url">request a new password</a>.
target: 您的 IP 地址的失败登录尝试过多。已临时阻止此 IP 地址。请稍后重试或者<a href=":url">申请新密码</a>。

en: There has been more than one failed login attempt for this account. It is temporarily blocked. Try again later or <a href=":url">request a new password</a>. | There have been more than @count failed login attempts for this account. It is temporarily blocked. Try again later or <a href=":url">request a new password</a>.
target[0]: 这个帐号有多次登录失败. 现在被临时封禁. 您需要过一天再试，或者 <a href=":url">请求一个新的密码</a>.
target[1]: 这个帐号有@count次登录失败. 现在被临时封禁. 您需要过一天再试，或者 <a href=":url">请求一个新的密码</a>.
