Login Security (2.0.2) - en to unknown language translation catalogue (37 entries)

en: Body
target: 正文

en: Subject
target: 主题

en: General settings
target: 常规设置

en: User
target: 用户

en: Host
target: 主机

en: To
target: 到

en: Email subject
target: 邮件主题

en: Tokens
target: 置换符

en: Track time
target: 跟踪时间

en: Maximum number of login failures before blocking a user
target: 在封禁一个用户前的最大登录错误尝试数

en: Maximum number of login failures before soft blocking a host
target: 在软封禁一个主机前的最大登录错误尝试数

en: Maximum number of login failures before blocking a host
target: 在封禁一个主机前的最大登录错误尝试数

en: Message to be shown on each failed login attempt
target: 每次登录尝试失败时显示的信息

en: Message for banned host (Soft IP ban)
target: 封禁主机的信息（软IP封禁）

en: Enter the soft IP ban message to be shown when a host attempts to log in too many times.
target: 输入当一个主机尝试登录次数过多而导致IP地址被软封禁时显示的信息。

en: Message for banned host (Hard IP ban)
target: 封禁主机的信息（硬IP封禁）

en: Enter the hard IP ban message to be shown when a host attempts to log in too many times.
target: 输入当一个主机尝试登录次数过多而导致IP地址被硬封禁时显示的信息。

en: Message when user is blocked by uid
target: 当用户ID被封禁时的信息

en: Enter the message to be shown when a user gets blocked due to enough failed login attempts.
target: 输入用户因为满足错误登录尝试而被禁用时显示的信息。

en: Email body
target: 电邮正文

en: Login Security
target: 登录安全

en: Notification
target: 通知

en: Disable login failure error message
target: 禁用登录失败错误信息

en: Notify the user about the number of remaining login attempts
target: 提醒用户剩余的可用登录次数

en: Display last login timestamp
target: 显示最后一次登录的时间

en: Display last access timestamp
target: 显示最后一次访问时间

en: Clear event tracking information
target: 清除事件跟踪信息

en: You have used @user_current_count out of @user_block_attempts login attempts. After all @user_block_attempts have been used, you will be unable to login.
target: 您使用过@user_current_count以多于@user_block_attempts的次数尝试登录网站。@user_block_attempts后，您将不能再登录。

en: This host is not allowed to log in to @site. Please contact your site administrator.
target: 主机不允许登入网站@site。请联系您的网站管理员。

en: The IP address @ip is banned at @site, and will not be able to access any of its content from now on. Please contact the site administrator.
target: IP地址@ip在@site上被禁用，从现在起不能访问它的任何内容。请联系网站管理员。

en: The user @username has been blocked due to failed login attempts.
target: 用户@username因失败的登录尝试已被封禁。

en: Security action: The user @username has been blocked.
target: 安全动作：用户@username已被封禁。

en: The user @username (@edit_uri) has been blocked at @site due to the amount of failed login attempts. Please check the logs for more information.
target: @site网站的用户@username (@edit_uri)已因超过失败登录总次数被封禁。请检查日志以获取更多信息。

en: Security information: Unexpected login activity has been detected at @site.
target: 安全信息：发现@site未知的登录活动。

en: The configured threshold of @activity_threshold logins has been reached with a total of @tracking_current_count invalid login attempts. You should review your log information about login attempts at @site.
target: 已配置的临界值@activity_threshold登录已达到@tracking_current_count次不正确的登录尝试。您应该查看您的@site网站的关于登录尝试的日志信息。

en: Your last login was @stamp.
target: 您上次登录的时间是@stamp。

en: Your last page access (site activity) was @stamp.
target: 您上次访问页面（网站活动）的时间是@stamp。
