Migrate Manifest (8.x-1.9) - en to unknown language translation catalogue (5 entries)

en: Migration
target: Migrering

en: New object was not saved, no error provided
target: Nytt objektet ble ikke lagret, ingen feil gitt

en: Migration @id did not meet the requirements. @message @requirements
target: Migrasjonen @id oppfyller ikke kravene. @message @requirements

en: Migration @id is busy with another operation: @status
target: Migrasjonen @id er opptatt med en annen handling: @status

en: Migration failed with source plugin exception: @e
target: Migrasjonen mislyktes med kildetillegg-unntak: @e
