Neuraflow (2.1.2) - en to unknown language translation catalogue (9 entries)

en: Pages
target: Síður

en: Content
target: Innihald

en: General settings
target: Almennar setingar

en: Visibility
target: Vísing

en: Roles
target: Leiklutir

en: Mode
target: Støða

en: About
target: Um

en: Not restricted
target: Ikki avmarkað

en: Restricted to certain pages
target: Avmarkað til ávísar síður
