Niobi Research Center (8.x-1.0-alpha7) - en to unknown language translation catalogue (5 entries)

en: On
target: 开启

en: Off
target: 关闭

en: Promoted to front page
target: 推荐到首页

en: Facility
target: 工具

en: Room
target: 客房
