No Request New Password (8.x-1.3) - en to unknown language translation catalogue (3 entries)

en: user
target: bruker

en: Login attempt failed for %user.
target: Påloggingsforsøk mislykket for %user.

en: Login attempt failed from %ip.
target: Påloggingsforsøk mislyktes fra %ip.
