Pathologic (8.x-1.0-alpha1) - en to unknown language translation catalogue (4 entries)

en: Scheme
target: Esquema

en: Input filters
target: Filtros de Entrada

en: Testing
target: Testando

en: Also considered local
target: Também considerado local
