Pause Player the videoplayer (8.x-1.1) - en to unknown language translation catalogue (6 entries)

en: Default
target: standard

en: Never
target: mai

en: Other
target: varias

en: Both
target: l'in(a) e l'auter

en: Debug
target: debugar

en: Autoplay
target: automatic laschar ir
