Pause Player the videoplayer (8.x-1.2) - en to unknown language translation catalogue (11 entries)

en: None
target: Ingen

en: Default
target: Standard

en: Never
target: Aldri

en: Width
target: Bredde

en: Height
target: Høyde

en: End
target: Slutt

en: Other
target: Annet

en: Both
target: Begge

en: Image path
target: Bildesti

en: Debug
target: Feilsøk

en: Autoplay
target: Spill av automatisk
