PhotoShelter (8.x-3.0-alpha1) - en to unknown language translation catalogue (4 entries)

en: Galleries
target: Galerias

en: Maximum height
target: Altura máxima

en: Maximum width
target: Largura máxima

en: Finished with an error.
target: Terminou com um erro.
