PHP Compatibility Scanner (1.0.0-beta1) - en to unknown language translation catalogue (7 entries)

en: Status
target: Staid

en: Type
target: Seòrsa

en: Actions
target: Gnìomhan

en: Administration
target: Rianachd

en: Error
target: Mearachd

en: Not found
target: Cha deach a lorg

en: Module
target: Mòideal
