Power Reviews (8.x-1.0-alpha4) - en to unknown language translation catalogue (3 entries)

en: The configuration options have been saved.
target: 配置选项已保存。

en: Custom
target: 自定义

en: The settings have not been saved because of the errors.
target: 出现错误，设置未被保存。
