Power Reviews (8.x-2.1) - en to unknown language translation catalogue (3 entries)

en: The configuration options have been saved.
target: Innstillingene er lagret.

en: Custom
target: Tilpasset

en: The settings have not been saved because of the errors.
target: På grunn av feilene er innstillingene ikke blitt lagret.
