Password Reset Landing Page (PRLP) (8.x-1.4) - en to unknown language translation catalogue (2 entries)

en: Administration
target: Fyrisiting

en: You have tried to use a one-time login link that has expired. Please request a new one using the form below.
target: Tú hevur roynt at nýta eitt eingangs innritingarleinki sum er útgingið. Vinarliga bið um eitt nýtt, við at nýta formularin niðanfyri.
