Range Slider (8.x-1.5) - en to unknown language translation catalogue (7 entries)

en: None
target: Nenhum

en: Left
target: Esquerda

en: Right
target: Direita

en: Orientation
target: Orientação

en: Above
target: Acima

en: Output
target: Saída

en: Below
target: Abaixo
