Raven: Sentry Integration (7.3.2) - en to unknown language translation catalogue (6 entries)

en: Disabled
target: Óvirkjað

en: Enabled
target: Virkjað

en: Error
target: Feilur

en: Host
target: Vertstelda

en: Log message
target: Boð í gerðalista

en: Not enabled
target: Ikki virkjað
