Read only mode (8.x-1.4) - en to unknown language translation catalogue (5 entries)

en: Enabled
target: Virkjað

en: Administration
target: Fyrisiting

en: Default
target: Standard

en: About
target: Um

en: Warning message
target: Ávaringarboð
