ReplayWeb.page Player (1.0.0-beta3) - en to unknown language translation catalogue (4 entries)

en: Custom
target: definì da l'utilisader

en: pixels
target: pixel

en: Maximum height
target: maximalmains summa

en: Maximum width
target: maximalmains amplezza
