ReplayWeb.page Player (1.0.1) - en to unknown language translation catalogue (4 entries)

en: Custom
target: Tilpasset

en: pixels
target: piksler

en: Maximum height
target: Maksimal høyde

en: Maximum width
target: Maksimal bredde
