Robolytix (8.x-1.0) - en to unknown language translation catalogue (7 entries)

en: Delete
target: Eliminar

en: Remove
target: Remover

en: General settings
target: Definições gerais

en: Update
target: Atualizar

en: Statistics
target: Estatísticas

en: Create
target: Criar

en: Custom fields
target: Campos personalizados
