Schema Diff (1.0.0-alpha1) - en to unknown language translation catalogue (3 entries)

en: Installed
target: Installert

en: Entity/field definitions
target: Entitet/felt-definisjoner

en: The following changes were detected in the entity type and field definitions. @updates
target: Følgende endringer ble oppdaget i definisjonene for enhetstyper og felt. @updates
