Shunt (8.x-2.0-beta2) - en to unknown language translation catalogue (7 entries)

en: Status
target: Støða

en: Delete
target: Strika

en: Cancel
target: Avlýs

en: Description
target: Lýsing

en: Disable
target: Óvirkja

en: Disabled
target: Óvirkjað

en: Enabled
target: Virkjað
