Site Settings Path Alias (8.x-1.0) - en to unknown language translation catalogue (3 entries)

en: Configuration
target: 配置

en: The path '%path' has to start with a slash.
target: 路径“%path”必须以斜杠开头。

en: Either the path '%path' is invalid or you do not have access to it.
target: 或者路径 '%path'是无效的，或者你没有访问它的权限.
