Tenon IO (8.x-2.0-beta1) - en to unknown language translation catalogue (5 entries)

en: None
target: Tiada

en: High
target: Tinggi

en: Low
target: Rendah

en: Count
target: Bilangan

en: Medium
target: Sederhana
